0 0.5 1 Data AIRS Fit Bruker SRF

0 0.01

0.02 Data Conv Fit

666 667 668 669 670 671 672 673 674 -5 0 5 10 x 10^{-3}

Wavenumber (cm^{-1} )

Data - Conv Fit

Normalized SRF Units (Max(SRF)=1)