800 1000 1200 1400 1600 1800 2000 2200 2400 2600

-1.5

-1

-0.5

0

0.5

1

1.5 AWEX: ARM-SGP 19 Nov 03 0831z, AIRS overpass 0814z

RS-90 water SRL water