700 800 900 1000 1100 1200 1300 1400 1500 1600 -4 -2 0 2 4 ARM-SGP day nearest clear FOV w/site prof

700 800 900 1000 1100 1200 1300 1400 1500 1600 -4 -2 0 2 4 ARM-SGP night nearest clear FOV w/site prof