800 1000 1200 1400 1600 1800 2000 2200 2400 2600 220 240 260 280 300 2003/06/20/uniform_clear068 fov74, solzen=46.6

800 1000 1200 1400 1600 1800 2000 2200 2400 2600 -10 -5 0 5 10